From 50484fb97efd62aceafdbb78ed575e94ff7bb1fd Mon Sep 17 00:00:00 2001
From: Sascha <GlancingMind@outlook.com>
Date: Wed, 3 Mar 2021 18:14:37 +0100
Subject: Fix spacing between cancle and save button

---
 webui/src/pages/list/ListQuery.tsx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'webui/src/pages/list/ListQuery.tsx')

diff --git a/webui/src/pages/list/ListQuery.tsx b/webui/src/pages/list/ListQuery.tsx
index 021f70b0..fec7c33b 100644
--- a/webui/src/pages/list/ListQuery.tsx
+++ b/webui/src/pages/list/ListQuery.tsx
@@ -112,7 +112,7 @@ const useStyles = makeStyles<Theme, StylesProps>((theme) => ({
       padding: theme.spacing(2, 3),
     },
   },
-  newIssueButton: {
+  greenButton: {
     backgroundColor: theme.palette.success.main,
     color: theme.palette.success.contrastText,
   },
@@ -315,7 +315,7 @@ function ListQuery() {
         <IfLoggedIn>
           {() => (
             <Button
-              className={classes.newIssueButton}
+              className={classes.greenButton}
               variant="contained"
               href="/new"
             >
-- 
cgit 

