From d80b2ad03898eb798f8c3c95a4c10bd119691e01 Mon Sep 17 00:00:00 2001
From: Sascha <GlancingMind@outlook.com>
Date: Sun, 28 Mar 2021 11:02:48 +0200
Subject: Prevent page reload for redirecting components

Link instantly to:

- NewBugPage
- BackToList
---
 webui/src/components/BackToListButton.tsx | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

(limited to 'webui/src/components/BackToListButton.tsx')

diff --git a/webui/src/components/BackToListButton.tsx b/webui/src/components/BackToListButton.tsx
index 7ca53ad0..41e1d68a 100644
--- a/webui/src/components/BackToListButton.tsx
+++ b/webui/src/components/BackToListButton.tsx
@@ -1,4 +1,5 @@
 import React from 'react';
+import { Link } from 'react-router-dom';
 
 import Button from '@material-ui/core/Button';
 import { makeStyles } from '@material-ui/core/styles';
@@ -25,7 +26,8 @@ function BackToListButton() {
       variant="contained"
       className={classes.backButton}
       aria-label="back to issue list"
-      href="/"
+      component={Link}
+      to="/"
     >
       <ArrowBackIcon />
       Back to List
-- 
cgit 

